------------------------  VER - Internal DOS Command  --------------------------

VER displays the DOS version number currently in use.

FORMAT:   VER

REMARKS:

   DOS version numbers are used by the manufacturer to identify DOS software.
   The version number has the form V.NN, where V is the Major version number
   (such as 1, 2, 3) and N is the Minor version number (such as 00, 1, 11).

   Some programs will work only with specific DOS versions.  If a new program
   does not work, you can use VER to see if you are using the correct DOS
   version.

EXAMPLE:

Display the DOS Version currently in use:

          VER

   DOS will respond with something like:

          IBM Personal Computer DOS Version 2.1
